%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%
%   Style for CMS Computing / Physics Technical Design Reports
%
%   Lucas Taylor  4 Feb 2005,   Revised  12 Oct 2005
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%  the following line is edited by the tdr script to change or to pass
%  additional options:
\documentclass[11pt,twoside,a4paper,tdr]{cms-tdr}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\begin{document}

%%% BEGIN EDITABLE REGION %%%

