Events

0

10

20

30 310 × Data tW Non-W/Z tt DY Vt VV+t Uncertainty

CMS = 13 TeV s, ^{-1}

35.9 fb

Preliminary + 2j1b

±

μ^±e

2j1b BDT output bin

1 2 3 4 5 6

Data/MC

0.6 1 1.4