0

50

100

150

200

Fakes: 3 tW: 109 ttbar: 642

DY: 1

VVttV: 5

CMS (13 TeV) -1 35.9 fb Preliminary

LeadingJetPt_7

1 2 3 4 5 6 7 8 9 10

Data/MC

0.8 0.9 1 1.1 1.2